---
code: not_found
title: Not found
status: 404
---

# Not found

The requested resource does not exist or is not available at the requested path.

## When It Happens

This can happen when the URL is incorrect, the resource identifier does not exist, or the resource is not visible through the public API.

## How To Fix

Check the endpoint path and resource identifier, then retry with a resource that exists and is available to the request.
