---
code: internal_error
title: Internal error
status: 500
---

# Internal error

An unexpected server-side failure prevented the request from completing.

## When It Happens

This means the platform encountered an unexpected condition while processing a valid request.

## How To Fix

Retry the request after a short delay. If the problem continues, contact support with the request details and timestamp.
